)c (GeV/ Tp

Ratio to combined spectrum

2 3 4 5 6 0.8 1 1.2 1.4 ITS+TPC+TOF HMPID rel. rise x/d E TPC d

-π + ^+π

0-5% V0A class (Pb-side)

2 3 4 5 6

= 5.02 TeV NNs ALICE p-Pb

- + K +K 2 3 4 5 6 p p +

2 3 4 5 6 0.8 1 1.2 1.4 20-40%

2 3 4 5 6 2 3 4 5 6

2 3 4 5 6 0.8 1 1.2 1.4_{60-80%}

2 3 4 5 6 2 3 4 5 6